BECE Results 2025 Release Date & Checker: WAEC Updates

The BECE Results 2025 are one of the most anticipated academic releases in Ghana. Conducted by WAEC (West African Examinations Council), the Basic Education Certificate Examination (BECE) determines the placement of JHS graduates into Senior High Schools (SHS). Here’s everything you need to know — from the expected release date to how to check your results online or via SMS.

When Will BECE 2025 Results Be Released?

The West African Examinations Council (WAEC) typically releases BECE results approximately 11-12 weeks after the exams conclude. For BECE 2025, which ended on June 18, 2025, the results are anticipated to be released between July 28th and August 14th, 2025, with some sources specifically mentioning August 8th, 2025, as a likely date.

Note: Bookmark this page for updates once WAEC officially confirms the release date.

What information do I need to check my BECE 2025 results?

You will need the following information:

Your Index Number

The Exam Year (2025)

The Exam Type (BECE School or BECE Private)

The PIN and Serial Number from your BECE result checker.

How to Check BECE 2025 Results Online (WAEC Portal)

Follow these simple steps to check your results online:

Visit the official WAEC Ghana results portal: https://eresults.waecgh.org

Select “BECE” as your examination type.

Choose the exam year: 2025.

Enter your 10-digit Index Number.

Enter your eVoucher PIN and Serial Number.

Click “Submit” to view your results.

Print or screenshot your results for future reference.

How to Check BECE 2025 Results by SMS

You can also get your results via SMS on your mobile phone:

Text Format:
BECE *IndexNumber* *PIN* *ExamYear
Example:
BECE 0101010101 123456789012 2025

Send to: Shortcode 9448 (MTN, Vodafone, AirtelTigo)

Where to Buy BECE Result Checker eVoucher

You’ll need an eVoucher PIN and Serial Number to access your results. Here’s where to buy:

Online at resultschecker.com.gh

Banks: GCB, ADB, CBG, and Ecobank branches nationwide.

Mobile money via vendors and some platforms offering Momo-based purchases.

Price Range: GHS 15–20 depending on source.

What should I do if I encounter issues while checking my results?

If you experience any issues, you can contact WAEC Ghana directly:

Address: WAEC Head Office, Behind Ridge Hospital, Accra.

Phone: +233 302 208201-9

Email: info@waecgh.org

What is the grading system for BECE?

WAEC uses a nine-point numerical scale for grading BECE candidates, with Grade 1 being the highest performance and Grade 9 the lowest. Generally, grades are:

A1 (Excellent): 75% – 100%

B2 (Very Good): 70% – 74%

B3 (Good): 65% – 69%

C4 (Credit): 60% – 64%

C5 (Credit): 55% – 59%

C6 (Credit): 50% – 54%

D7 (Pass): 45% – 49%

E8 (Pass): 40% – 44%

F9 (Fail): 0% – 39%

Thank you for visiting GHResults.com — we wish you all the best on your journey ahead, and we look forward to welcoming you back soon!

The post BECE Results 2025 Release Date & Checker: WAEC Updates appeared first on 2025 GH Results.