ICAG Exam Results: Check May & November Results Online

The ICAG exam results are generally released a specific period after the exams. For example, some sources indicate results are released on the same day as Level 2 and Level 3 professional qualification exam results, or approximately 30 days after the exams. It’s always best to check the official ICAG website or announcements for the exact release date for your specific exam diet.

ICAG Exam Results 2025 – How to Check Online

Follow these steps to check your exam results:

Visit the official ICAG results portal: https://icagh.com

Click on “Examination Results” or go directly to the student login page.

Enter your Student Registration Number and PIN/Password.

Select your exam sitting (May or November 2025).

Click Submit to view your results.

Download or print your results slip for records.

Important Dates for 2025 Exams

May 2025 Exam Results Release: July 2025

November 2025 Exam Results Release: January 2026

Re-marking/Appeal Window: Within 14 days of release

Next Registration Deadline: March 2026 for May exams

What to Do After Receiving Your ICAG Results

If You Passed:

Proceed to register for the next level or apply for membership (if final level).

Download your transcript from the student portal.

Attend ICAG seminars and workshops to earn CPD points.

If You Didn’t Pass:

Review your marked scripts (optional).

Prepare for the next sitting using ICAG’s updated study packs.

Register early and consider enrolling in revision classes.

Contact ICAG for Help

Website: https://icagh.com

Email: exams@icagh.com | info@icagh.com

Phone: +233 (0)30 266 5521 / +233 (0)20 063 1428

Head Office: Okponglo, East Legon, Accra

Office Hours: Mon–Fri, 8:30 AM – 5:00 PM

What is the passing mark for ICAG professional exams?

The pass mark for ICAG professional examinations is generally 50%. Results are typically published as “pass” or “fail.”

What if I fail an ICAG exam paper? Can I retake it?

Yes, if a candidate fails to achieve the minimum pass mark in any assessment, they will typically need to retake that element. The maximum number of attempts for any assessment might be capped (e.g., two attempts: the first and one resit opportunity). You cannot retake an exam to improve a mark if you have already passed it.

How do I apply for a remark or review of my ICAG exam script?

Candidates can usually write to the Institute for permission to view their marked examination script within a specified period (e.g., one month) after the release of results, typically for a fee. For re-marking or appeals, there’s usually a formal procedure that involves submitting a request with supporting evidence.

What is the policy on deferring an ICAG exam?

Deferment requests are usually accepted within a specific timeframe (e.g., two weeks) before the date of the first paper, and can often be done through the student portal. An approved deferment usually allows you to postpone to the next examination only.

How can I get a transcript of my ICAG exam results?

Transcript applications are generally done on the student portal under the Examination Menu and usually attract a fee.

Where can I find past ICAG exam questions and answers?

It is highly recommended to prepare for the exams by solving past questions. ICAG often provides past questions and answers on their official website.

Does ICAG deliberately fail candidates to maintain standards?

The Institute of Chartered Accountants, Ghana (ICAG) has publicly rejected claims of deliberately failing applicants. They state that while their standards are high and rigorous, diligence and proper preparation will lead to qualification.

Thank you for visiting GHResults.com — we wish you all the best on your journey ahead, and we look forward to welcoming you back soon!

The post ICAG Exam Results: Check May & November Results Online appeared first on 2025 GH Results.